Date:       May 15, 2001 Sheet of

Size Document Number REV
B monrio.SCH

Title
Monrio MC202

Q?
D1046

Q?
D1046

Q?
D600

Q?
D600

F?

6.3Af

 +46

150mA idle

Q?
D1046

Q?
D600

Q?
D600

                                                                                         Vdelay

                                                                                                           +1.75v

                                                                                                                    +1.15v

+0.6v

                                                                                                                   C?
                                                                                                                  330p

                                                             Q?
                                                             BF423

                                                      Q?
                                                      BF423

                                                      R?
                                                      200

                                                              R?
                                                              200

                                                                        R?
                                                                        200

                                                                               R?
                                                                               200

                                                      20mA 20mA 20mA 20mA

                                      R?
                                      510

                              R?
                              510

                        R?
                        1k

                                            R?
                                            1k

                 2.1mA 2.1mA

                               3mA 3mA

          R?

          3k3
                              R?
                              100

                        Q?
                        BC546

                                        Q?
                                     BC546

                              Q?
                              BC556

                                       Q?

                                     BC556

 R?

20k

                                                         R?

                                                         64k9

                                                                               Q?
                                                                               BF423

                                                                       Q?
                                                                       BF423

                                                                             Q?
                                                                          BF423

                                                                                      Q?
                                                                                      BF423

                                                                                        C?

                                                                                       20p

                                                                                   +0.55v

R?
100

R?
200

                                                                                                                  Q?
                                                                                                                  D600

                                                                                                            R?
                                                                                                            2k2

                                                                                                     C?
                                                                                                     10n

                                                                                                          R?
                                                                                                          100

                                                                                                          R?
                                                                                                          470

R?
0.25

25mA

25mA

R?
100

R?
100

L?

11s/D=10mm

FB

R?
0.25

R?
0.25

25mA 25mA

25mA 25mA

Q?
D1046

Q?
D1046

Q?
B631

R?
100

Q?
B631

R?
100

R?
100

R?
100

D?
1N4148

D?
1N4148

R?
0.25

R?
0.25

Q?
D1046

Q?
B631

R?
100

Q?
B631

R?
200

R?
100

D?
1N4148

                                                                                                    Q?
                                                                                                    BF422

                                                                                                    R?
                                                                                                    200

R?
0.25

                                                                                                           -1.65v

                                                                                                                     -1.1v

-0.6v

                                                   R?
                                                   1k

                                                   C?
                                                   470u
                                                   6VL

                                                        K?

                                                        RELAY NC

                                                                          FB

                                                                                    Q?
                                                                                    BC546

                                                                                            Q?
                                                                                            BF422

                                                                                             R?
                                                                                             200

                                                                                    R?
                                                                                    100

                                                                 R?

                                                                 1k

                                                                     R?
                                                                     1k

                                                                 relay

                                                                                   -44.5v

                         C?

                         220p

                             Q?
                           BF422

                                       Q?
                                       BC546

                  R?
                  75k

                                  R?
                                  56

                                       R?
                                       22k

           C?
          220p

                            -0.8v

                            C?
                          680p

                                                                     Q?
                                                                     BC546

                                                             Q?
                                                             BC546

                                                                         Vdelay

                                                                         relay

                                                             R?
                                                             22k

                                                  C?
                                                  100u
                                                  63VL

                                                      R?

                                                     100k

                                                    R?

                                                   22k

                                                                              10mA

                                                                                             20mA 20mA

                                                                                                                   C?
                                                                                                                  330p F?

6.3Af

 -46
150mA idle